From cae1efd552ed0618b13120e07c346cbe28cbd00a Mon Sep 17 00:00:00 2001
From: Marien Fressinaud <dev@marienfressinaud.fr>
Date: Sat, 2 Mar 2013 00:36:12 +0100
Subject: Corrections quelques bugs + modif fichier config BDD + ajout fichier
 build.sh pour générer la lib Minz
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

---
 freshrss.sql | 13 +++++++++----
 1 file changed, 9 insertions(+), 4 deletions(-)

(limited to 'freshrss.sql')

diff --git a/freshrss.sql b/freshrss.sql
index 5be4da1c6..34ef29aa4 100644
--- a/freshrss.sql
+++ b/freshrss.sql
@@ -1,11 +1,11 @@
 -- phpMyAdmin SQL Dump
--- version 3.5.3
+-- version 3.5.5
 -- http://www.phpmyadmin.net
 --
 -- Client: localhost
--- Généré le: Dim 28 Octobre 2012 à 10:58
--- Version du serveur: 5.5.28-log
--- Version de PHP: 5.4.8
+-- Généré le: Sam 02 Mars 2013 à 00:09
+-- Version du serveur: 5.1.68-cll
+-- Version de PHP: 5.3.17
 
 SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";
 SET time_zone = "+00:00";
@@ -67,6 +67,7 @@ CREATE TABLE IF NOT EXISTS `feed` (
   `name` varchar(255) NOT NULL,
   `website` text NOT NULL,
   `description` text NOT NULL,
+  `lastUpdate` int(11) NOT NULL,
   PRIMARY KEY (`id`),
   KEY `category` (`category`)
 ) ENGINE=InnoDB DEFAULT CHARSET=utf8;
@@ -86,3 +87,7 @@ ALTER TABLE `entry`
 --
 ALTER TABLE `feed`
   ADD CONSTRAINT `feed_ibfk_4` FOREIGN KEY (`category`) REFERENCES `category` (`id`) ON DELETE SET NULL ON UPDATE CASCADE;
+
+/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
+/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
+/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
-- 
cgit v1.2.3

